Scale :chr4 Gap

miRNA ncRNA tRNA miscRNA

RepeatMasker

2 kb dm6 307,500

308,000

308,500

309,000

309,500

310,000

310,500

311,000

311,500 Gap Locations

FlyBase Protein-Coding Genes

FlyBase Pseudogenes FlyBase Non-protein Coding Genes

Repeating Elements by RepeatMasker

Rad23-RA Rad23-RC Rad23-RB

Zip102B-RB

Zip102B-RD Zip102B-RF Zip102B-RE