Scale contig1:

5 kb dm3gene 1,000 2,000 3,000 4,000 5,000 6,000 7,000 8,000 9,000 10,000 FlyBase Genes CG32165-RC CG32165-RB CG32165-RA spd-2-RA tra-RB tra-RA